== Upgrading from SL 6 ==

CAUTION: There is no supported upgrade path from Scientific Linux 6 to
         Scientific Linux 7.

While it may be possible to move from SL 6 to SL7, Scientific Linux does not
recommend or support such action. We have deliberately not provided any tools
for such a migration. +

WARNING: We believe any attempt to upgrade SL 6 to SL 7 will leave your system
         in an unknown and probably unsupportable state.

TIP: Upstream provides an upgrade toolkit for migrating their product from EL6
     to EL7.  Users who need this functionality should consider deploying
     link:http://www.redhat.com[TUV's supported product line] instead
     of Scientific Linux.

// vim: set syntax=asciidoc:
